<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% \subsubsection{hideEnv}
% \DescribeMacro{hideEnv}[replacementCode]{environmentName}
%   This macro allows you to hide an environment by name, ensuring it - and all its contents - are no longer visible on the pdf output. It also allows you an optional input to replace the block of content with new (uniform) content if desired.
%   #1 is replacementCode and is optional. This will be code that is executed when the env is executed,
%       even though the content of the environment is hidden.
%   #2 is the name of the environment which gets hidden.
%    \begin{macrocode}
%&lt;*classXimera&gt;
\newcommand{\hideEnv}[2][]{
    %% Syntax: \hideEnv[NewCode]{environmentName}

    \expandafter\def\csname temp@#2\endcsname\csname #2\endcsname
    \expandafter\def\csname temp@end#2\endcsname\csname end#2\endcsname
    \expandafter\def\csname#2\endcsname{
        \ifnum\value{depth@Check}&lt;1
        Suppress Should start here.
        \suppress
        \fi
        \stepcounter{depth@Check}
        
%        Current Depth reported as: \arabic{depth@Check}
        }
    \expandafter\def\csname end#2\endcsname{
        \addtocounter{depth@Check}{-1}
        \ifnum\value{depth@Check}&lt;1
        Suppress Should End Here.
        \endsuppress
        \fi
        
%        Current Depth reported as: \arabic{depth@Check}
    \noexpand{#1}
    }
    }
%&lt;/classXimera&gt;
%   \end{macrocode}

</pre></body></html>